-- 检澜 DockScope 演示数据快照（由 scripts/export_db_snapshot.py 生成）
-- 导出时间 UTC: 2026-06-03T07:57:02.785840+00:00
SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS=0;
SET sql_mode = 'NO_AUTO_VALUE_ON_ZERO';

-- MySQL dump 10.13  Distrib 8.0.46, for Linux (x86_64)
--
-- Host: localhost    Database: bridge_disease
-- ------------------------------------------------------
-- Server version	8.0.46

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!50503 SET NAMES utf8mb4 */;
/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

--
-- Dumping data for table `user`
--

LOCK TABLES `user` WRITE;
/*!40000 ALTER TABLE `user` DISABLE KEYS */;
INSERT INTO `user` (`user_id`, `username`, `email`, `password`, `first_name`, `last_name`, `role`, `avatar_path`, `phone`, `last_login`, `status`, `created_at`, `updated_at`, `deleted_at`) VALUES (1,'admin','admin@example.com','scrypt:32768:8:1$D3KfZgegKywPsVOR$9a87dafc3391fb8339e79b1b8c433b073d31dc63e9407dcc09a6cffa118582b0a5334cd07d71d18c924a59faf14e727507f75bc881176459c853d1f2190a0445','系统','管理员','ADMIN','static\\avatars\\1.jpg','10000000000','2026-06-03 15:38:02','ACTIVE','2026-06-01 08:39:57','2026-06-03 15:38:02',NULL),(2,'developer','dev@example.com','scrypt:32768:8:1$UtMwYLX1KSnmu6lk$3d7404f212eda78413ccab1c8a20a1836306d169cda9f5da635f92b3f3bd1c7649246d30feef87e093bb49508441eca5218c1bcec3638d33e0d68640732bc331','开发','人员','DEVELOPER','static\\avatars\\2.jpg','10000000001',NULL,'INACTIVE','2026-06-01 08:39:57','2026-06-01 18:58:50',NULL),(3,'demo','user@example.com','scrypt:32768:8:1$mWhiEV1orl2PKEmM$2a43af98b53f934dfec2841394dd5e5b40bd913b973f0c8b0aba7929a16e215f7aa03001378ea8c23a5d575f992a377eafa0789f19f6359d3d5a876ba973de84','演示','用户','USER','static\\avatars\\3.jpg','10000000002',NULL,'INACTIVE','2026-06-01 08:39:57','2026-06-01 18:58:50',NULL);
/*!40000 ALTER TABLE `user` ENABLE KEYS */;
UNLOCK TABLES;

--
-- Dumping data for table `model`
--

LOCK TABLES `model` WRITE;
/*!40000 ALTER TABLE `model` DISABLE KEYS */;
INSERT INTO `model` (`model_id`, `model_name`, `model_path`, `disease_category`, `augmentation`, `layers`, `parameters`, `GFLOPs`, `box_p`, `box_r`, `box_mAP50`, `box_mAP50_95`, `mask_p`, `mask_r`, `mask_mAP50`, `mask_mAP50_95`, `f1_score`, `fitness_score`, `created_at`, `updated_at`, `owner_id`) VALUES (1,'steel_corrosion.pt','static\\models\\steel_corrosion.pt','钢构件锈蚀','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.972,0.925,0.966,0.878,0.973,0.919,0.956,0.66,1.8931,1.57629,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(2,'steel_coating_peel_bubble.pt','static\\models\\steel_coating_peel_bubble.pt','钢构件涂层剥脱/鼓包','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.832,0.803,0.844,0.661,0.831,0.759,0.799,0.473,1.6103,1.18434,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(3,'concrete_peeling_rebar.pt','static\\models\\concrete_peeling_rebar.pt','混凝土剥落露筋','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.924,0.76,0.851,0.655,0.884,0.731,0.803,0.475,1.6338,1.18312,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(4,'steel_crack.pt','static\\models\\steel_crack.pt','钢构件裂缝','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.805,0.768,0.778,0.608,0.646,0.546,0.489,0.197,1.378,0.85097,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(5,'concrete_crack.pt','static\\models\\concrete_crack.pt','混凝土裂缝','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.909,0.89,0.941,0.771,0.759,0.628,0.615,0.197,1.5863,1.02686,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(6,'concrete_weathering.pt','static\\models\\concrete_weathering.pt','混凝土风化','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.884,0.737,0.804,0.634,0.87,0.72,0.782,0.476,1.5919,1.15776,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(7,'road_pothole.pt','static\\models\\road_pothole.pt','路面坑凼','随机点+颜色扭曲+高斯模糊',113,10070299,35.3,0.954,0.935,0.973,0.809,0.958,0.931,0.973,0.735,1.8882,1.58462,'2026-06-01 08:39:57','2026-06-02 11:16:10',2),(8,'result.pt','static/models/result.pt','钢构件腐蚀','随机点+颜色扭曲+高斯模糊',262,3264006,35.3,0,0,0,0,0,0,0,0,0,0,'2026-06-03 15:28:05','2026-06-03 15:28:05',1),(9,'result_893b08.pt','static/models/result_893b08.pt','钢构件腐蚀','随机点+颜色扭曲+高斯模糊',262,3264006,35.3,0.004,0.5,0.004,0.002,0,0,0,0,0,0.00413,'2026-06-03 15:31:09','2026-06-03 15:31:09',1),(10,'result_5ef5a1.pt','static/models/result_5ef5a1.pt','钢构建腐蚀','随机点+颜色扭曲+高斯模糊',262,3264006,35.3,0,0,0,0,0,0,0,0,0,0,'2026-06-03 15:35:22','2026-06-03 15:35:22',1),(11,'re.pt','static/models/re.pt','钢构腐蚀','随机点+颜色扭曲+高斯模糊',262,3264006,35.3,0,0,0,0,0,0,0,0,0,0,'2026-06-03 15:36:42','2026-06-03 15:36:42',1);
/*!40000 ALTER TABLE `model` ENABLE KEYS */;
UNLOCK TABLES;

--
-- Dumping data for table `media`
--

LOCK TABLES `media` WRITE;
/*!40000 ALTER TABLE `media` DISABLE KEYS */;
INSERT INTO `media` (`media_id`, `media_name`, `media_path`, `description`, `file_size`, `file_type`, `resolution_width`, `resolution_height`, `frame_count`, `upload_at`, `updated_at`, `owner_id`) VALUES (17,'混凝土桥面裂缝_01.jpg','static/medias/01_concrete_crack_bridge.jpg','桥梁混凝土底板裂缝（德国 Darmsheim 桥，实景）',278.67,'jpeg',1600,1200,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',1),(18,'桥梁混凝土结构裂缝_02.jpg','static/medias/02_bridge_concrete_cracks.jpg','桥梁混凝土结构多处裂缝（实景）',325.76,'jpeg',1600,1200,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',2),(20,'混凝土弯曲裂缝_04.jpg','static/medias/04_concrete_bending_cracks.jpg','混凝土试件弯曲裂缝（RILEM 三点弯曲试验实景）',180.66,'jpeg',1280,1024,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',2),(21,'桥梁下部结构_05.jpg','static/medias/05_bridge_substructure.jpg','桥梁混凝土底板与下部结构裂缝（实景）',83.8,'jpeg',1600,803,1,'2026-06-01 18:40:58','2026-06-01 18:41:50',1),(22,'混凝土收缩裂缝_06.jpg','static/medias/06_shrinkage_cracks_concrete.jpg','钢筋混凝土收缩裂缝（实景）',131.82,'jpeg',600,857,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',3),(23,'桥面铺装龟裂_07.jpg','static/medias/07_asphalt_crocodile_cracking.jpg','沥青路面龟裂网状裂缝（实景）',299,'jpeg',1600,890,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',1),(24,'混凝土钢筋锈蚀_08.jpg','static/medias/08_concrete_rebar_corrosion.jpg','混凝土结构钢筋锈蚀与表面劣化（实景）',166.84,'jpeg',1600,1067,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',3),(25,'施工现场钢梁_09.jpg','static/medias/09_steel_beam_site.jpg','施工现场钢梁吊装与拼装（实景）',197.06,'jpeg',1600,1159,1,'2026-06-01 18:40:58','2026-06-01 18:40:58',1);
/*!40000 ALTER TABLE `media` ENABLE KEYS */;
UNLOCK TABLES;

--
-- Dumping data for table `detection`
--

LOCK TABLES `detection` WRITE;
/*!40000 ALTER TABLE `detection` DISABLE KEYS */;
INSERT INTO `detection` (`detection_id`, `result_path`, `disease_count`, `disease_perimeter`, `disease_area`, `shape_complexity`, `texture_roughness`, `crack_width`, `avg_hue`, `disease_severity_score`, `disease_grade`, `disease_description`, `detection_duration`, `avg_frame_detection_duration`, `status`, `detection_at`, `updated_at`, `owner_id`, `model_id`, `media_id`) VALUES (1,'static/results/admin/01_concrete_crack_bridge.jpg',3,842.5,12560,0.41,128,4.2,42,0.95,'CRITICAL','【混凝土裂缝】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 3 处，覆盖面积约 12560 像素。',4005.62,933.07,'COMPLETED','2026-05-05 04:13:57','2026-06-02 11:16:10',1,5,17),(2,'static/results/admin/02_bridge_concrete_cracks.jpg',2,610,9800,0.35,95,3.1,38,0.643,'SEVERE','【混凝土裂缝】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 2 处，覆盖面积约 9800 像素。',1859.2,1001.8,'COMPLETED','2026-05-06 05:26:57','2026-06-02 11:16:10',1,5,18),(3,'static/results/admin/04_concrete_bending_cracks.jpg',5,1200,18200,0.52,210,0,55,0.95,'CRITICAL','【路面坑凼】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 5 处，覆盖面积约 18200 像素。',3139.27,996.84,'COMPLETED','2026-05-07 06:39:57','2026-06-02 11:16:10',1,7,20),(4,'static/results/admin/05_bridge_substructure.jpg',4,920,15400,0.48,165,0,12,0.95,'CRITICAL','【钢构件锈蚀】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 4 处，覆盖面积约 15400 像素。',3188.86,1040.31,'COMPLETED','2026-05-08 07:52:57','2026-06-02 11:16:10',1,1,21),(5,'static/results/admin/06_shrinkage_cracks_concrete.jpg',2,480,6200,0.29,88,5.8,28,0.577,'SEVERE','【混凝土剥落露筋】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 2 处，覆盖面积约 6200 像素。',3818.52,1046.86,'COMPLETED','2026-05-09 09:05:57','2026-06-02 11:16:10',1,3,22),(6,'static/results/admin/07_asphalt_crocodile_cracking.jpg',1,320,4100,0.22,62,2.4,40,0.41,'MODERATE','【混凝土裂缝】存在中等程度结构隐患，建议安排专项复核与养护。 检出隐患 1 处，覆盖面积约 4100 像素。',2063.61,987.33,'COMPLETED','2026-05-10 09:18:57','2026-06-02 11:16:10',1,5,23),(7,'static/results/admin/08_concrete_rebar_corrosion.jpg',3,750,11200,0.38,142,0,48,0.797,'SEVERE','【混凝土风化】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 3 处，覆盖面积约 11200 像素。',3622.26,1115.18,'IN_PROGRESS','2026-06-02 11:44:14','2026-06-02 11:44:14',1,1,24),(8,'static/results/admin/09_steel_beam_site.jpg',4,1105,16800,0.45,155,3.8,36,0.95,'CRITICAL','【混凝土裂缝】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 4 处，覆盖面积约 16800 像素。',2541.15,1199.14,'COMPLETED','2026-05-12 11:44:57','2026-06-02 11:16:10',1,5,25),(9,'static/results/developer/01_concrete_crack_bridge.jpg',2,540,8900,0.33,102,6.1,15,0.575,'SEVERE','【钢构件裂缝】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 2 处，覆盖面积约 8900 像素。',4386.23,1044.36,'COMPLETED','2026-05-13 04:57:57','2026-06-02 11:16:10',2,4,17),(10,'static/results/developer/02_bridge_concrete_cracks.jpg',3,680,9400,0.36,118,0,22,0.75,'SEVERE','【钢构件涂层剥脱/鼓包】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 3 处，覆盖面积约 9400 像素。',2932.43,1069.18,'COMPLETED','2026-05-14 06:10:57','2026-06-02 11:16:10',2,2,18),(11,'static/results/developer/04_concrete_bending_cracks.jpg',5,1350,22100,0.58,198,0,8,0.95,'CRITICAL','【钢构件锈蚀】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 5 处，覆盖面积约 22100 像素。',3018.53,1142.47,'COMPLETED','2026-05-15 06:23:57','2026-06-02 11:16:10',2,1,20),(12,'static/results/developer/05_bridge_substructure.jpg',6,1580,24500,0.61,225,0,60,0.95,'CRITICAL','【路面坑凼】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 6 处，覆盖面积约 24500 像素。',3755.79,929.95,'COMPLETED','2026-05-16 07:36:57','2026-06-02 11:16:10',2,7,21),(13,'static/results/developer/06_shrinkage_cracks_concrete.jpg',1,210,2800,0.18,45,4.5,30,0.281,'MODERATE','【混凝土剥落露筋】存在中等程度结构隐患，建议安排专项复核与养护。 检出隐患 1 处，覆盖面积约 2800 像素。',4328.18,1134.87,'COMPLETED','2026-05-17 08:49:57','2026-06-02 11:16:10',2,3,22),(14,NULL,2,590,7600,0.31,91,2.9,41,0.671,'SEVERE','【混凝土裂缝】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 2 处，覆盖面积约 7600 像素。',4275.82,1106.02,'FAILED','2026-05-18 10:02:57','2026-06-02 11:16:10',2,5,23),(15,'static/results/developer/08_concrete_rebar_corrosion.jpg',2,505,7200,0.27,78,3.2,39,0.504,'SEVERE','【混凝土裂缝】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 2 处，覆盖面积约 7200 像素。',3799.97,1058.3,'COMPLETED','2026-05-19 10:15:57','2026-06-02 11:16:10',2,5,24),(16,'static/results/developer/09_steel_beam_site.jpg',3,890,13100,0.42,136,7.2,25,0.878,'CRITICAL','【混凝土剥落露筋】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 3 处，覆盖面积约 13100 像素。',2937.54,1014.56,'COMPLETED','2026-05-20 11:28:57','2026-06-02 11:16:10',2,3,25),(17,'static/results/demo/01_concrete_crack_bridge.jpg',4,1020,14900,0.44,148,0,10,0.95,'CRITICAL','【钢构件锈蚀】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 4 处，覆盖面积约 14900 像素。',3349.07,964.43,'COMPLETED','2026-05-21 04:41:57','2026-06-02 11:16:10',3,1,17),(18,'static/results/demo/02_bridge_concrete_cracks.jpg',2,430,5500,0.24,58,0,52,0.517,'SEVERE','【混凝土风化】隐患较为明显，应尽快组织检测评估并制定处置方案。 检出隐患 2 处，覆盖面积约 5500 像素。',3270.45,887.66,'COMPLETED','2026-05-22 05:54:57','2026-06-02 11:16:10',3,6,18),(19,'static/results/demo/04_concrete_bending_cracks.jpg',1,180,2200,0.16,40,5.2,18,0.307,'MODERATE','【钢构件裂缝】存在中等程度结构隐患，建议安排专项复核与养护。 检出隐患 1 处，覆盖面积约 2200 像素。',2002.61,982.23,'COMPLETED','2026-05-23 07:07:57','2026-06-02 11:16:10',3,4,20),(20,'static/results/demo/05_bridge_substructure.jpg',4,990,14200,0.39,125,0,58,0.95,'CRITICAL','【路面坑凼】隐患严重，需立即采取限载或封闭措施并启动应急处置。 检出隐患 4 处，覆盖面积约 14200 像素。',2262.96,1154.48,'COMPLETED','2026-05-24 07:20:57','2026-06-02 11:16:10',3,7,21);
/*!40000 ALTER TABLE `detection` ENABLE KEYS */;
UNLOCK TABLES;

--
-- Dumping data for table `operation`
--

LOCK TABLES `operation` WRITE;
/*!40000 ALTER TABLE `operation` DISABLE KEYS */;
INSERT INTO `operation` (`operation_id`, `operation_type`, `description`, `duration`, `failure_message`, `ip_address`, `device_info`, `status`, `created_at`, `owner_id`) VALUES (1,'AUTHENTICATE','用户登录',0.122859,'无','127.0.0.1','curl/8.19.0','SUCCESS','2026-06-01 16:43:08',1),(2,'AUTHENTICATE','用户登录',0.0918164,'【登录失败】密码错误','127.0.0.1','curl/8.19.0','FAILURE','2026-06-01 16:43:08',1),(3,'AUTHENTICATE','用户登录',0.121702,'无','127.0.0.1','curl/8.19.0','SUCCESS','2026-06-01 16:43:26',1),(4,'AUTHENTICATE','用户登录',0.109509,'【登录失败】密码错误','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','FAILURE','2026-06-01 16:43:34',1),(5,'AUTHENTICATE','用户登录',0.110602,'【登录失败】密码错误','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','FAILURE','2026-06-01 16:43:36',1),(6,'AUTHENTICATE','用户登录',0.143528,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-01 16:43:50',1),(7,'AUTHENTICATE','刷新用户 token',0.0281301,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-01 18:12:59',1),(8,'AUTHENTICATE','用户登录',0.107409,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-01 18:20:22',1),(9,'AUTHENTICATE','用户登录',0.111486,'无','127.0.0.1','curl/8.19.0','SUCCESS','2026-06-01 18:27:17',1),(10,'AUTHENTICATE','用户登录',0.0963535,'无','127.0.0.1','curl/8.19.0','SUCCESS','2026-06-01 18:27:17',1),(11,'DELETE','删除媒体 ID=19',0.0450885,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-01 18:42:43',1),(12,'AUTHENTICATE','刷新用户 token',0.0079143,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-01 19:14:17',1),(13,'AUTHENTICATE','刷新用户 token',0.466056,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-02 00:11:50',1),(14,'AUTHENTICATE','刷新用户 token',0.691715,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-02 09:11:38',1),(15,'AUTHENTICATE','刷新用户 token',0.0316894,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-02 11:09:27',1),(16,'EXECUTE','执行病害检测分割',0.0913115,'【检测分割失败】模型文件不存在：static\\models\\steel_corrosion.pt','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','FAILURE','2026-06-02 11:44:14',1),(17,'AUTHENTICATE','刷新用户 token',0.0964787,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-02 13:31:00',1),(18,'AUTHENTICATE','用户登录',0.309767,'【登录失败】密码错误','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','FAILURE','2026-06-03 13:48:25',1),(19,'AUTHENTICATE','用户登录',0.195485,'【登录失败】密码错误','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','FAILURE','2026-06-03 13:48:27',1),(20,'AUTHENTICATE','用户登录',0.210526,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 13:49:11',1),(21,'AUTHENTICATE','刷新用户 token',0.0192301,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 14:51:33',1),(22,'AUTHENTICATE','用户登录',0.0132804,'【登录失败】用户名或邮箱和密码是必填项','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','FAILURE','2026-06-03 15:06:57',NULL),(23,'AUTHENTICATE','用户登录',0.136499,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:07:19',1),(24,'AUTHENTICATE','用户登录',0.242462,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:07:59',1),(25,'AUTHENTICATE','用户登录',0.118483,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:08:50',1),(26,'AUTHENTICATE','用户登录',0.118165,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:08:56',1),(27,'AUTHENTICATE','用户登录',0.121542,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:09:02',1),(28,'AUTHENTICATE','用户登录',0.170691,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:10:25',1),(29,'AUTHENTICATE','用户登录',0.15385,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:10:50',1),(30,'AUTHENTICATE','用户登录',0.148484,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:11:45',1),(31,'AUTHENTICATE','用户登录',0.154194,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:16:34',1),(32,'AUTHENTICATE','用户登录',0.135937,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:17:41',1),(33,'CREATE','上传训练数据集',0.0571806,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:20:45',1),(34,'EXECUTE','启动 YOLO 模型训练',0.00677347,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:21:35',1),(35,'AUTHENTICATE','用户登录',0.125304,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:22:20',1),(36,'AUTHENTICATE','用户登录',0.144079,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:26:10',1),(37,'EXECUTE','启动 YOLO 模型训练',0.0485244,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:26:27',1),(38,'AUTHENTICATE','用户登录',0.13991,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:26:55',1),(39,'AUTHENTICATE','用户登录',0.202654,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:27:52',1),(40,'AUTHENTICATE','用户登录',0.145541,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:28:29',1),(41,'CREATE','上传训练数据集',0.0670707,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:29:31',1),(42,'EXECUTE','启动 YOLO 模型训练',0.00447774,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:30:03',1),(43,'AUTHENTICATE','用户登录',0.133342,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:30:39',1),(44,'AUTHENTICATE','用户登录',0.158621,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:31:03',1),(45,'AUTHENTICATE','用户登录',0.13481,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:31:22',1),(46,'EXECUTE','启动 YOLO 模型训练',0.00466084,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:32:19',1),(47,'AUTHENTICATE','用户登录',0.121019,'无','127.0.0.1','Mozilla/5.0 (Windows NT; Windows NT 10.0; zh-CN) WindowsPowerShell/5.1.26100.8457','SUCCESS','2026-06-03 15:34:20',1),(48,'AUTHENTICATE','用户登录',0.188114,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:35:17',1),(49,'EXECUTE','启动 YOLO 模型训练',0.00373483,'无','127.0.0.1','Mozilla/5.0 (Windows NT 10.0; Win64; x64) AppleWebKit/537.36 (KHTML, like Gecko) Chrome/137.0.0.0 Safari/537.36','SUCCESS','2026-06-03 15:36:28',1),(50,'AUTHENTICATE','用户登录',0.11975,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:37:13',1),(51,'AUTHENTICATE','用户登录',0.128481,'无','127.0.0.1','python-requests/2.34.2','SUCCESS','2026-06-03 15:38:02',1);
/*!40000 ALTER TABLE `operation` ENABLE KEYS */;
UNLOCK TABLES;
/*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

-- Dump completed on 2026-06-03  7:57:03

SET FOREIGN_KEY_CHECKS=1;
