CREATE DATABASE IF NOT EXISTS `ry-config` DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
CREATE DATABASE IF NOT EXISTS `ry-cloud` DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
